Lumi per Expt (pb^{-1})

LEP-wide Error on M_W (MeV)

M_W Precision, 4 expts combined stat. 1 syst. errors stat. error only 1 30 MeV on WW5qqqq qqlν only

Precision of prediction from SM fit

500 300 700 0 10 20 30 40 50 60 70 80 90

10^2 10^3